DROP TABLE IF EXISTS `mall_admin_user`;
CREATE TABLE `mall_admin_user`  (
  `id` int(10) UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键id',
  `username` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '用户名',
  `password` char(32) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '密码',
  `status` tinyint(1) UNSIGNED NOT NULL COMMENT '1正常，0待审，99删除',
  `create_time` int(10) UNSIGNED NOT NULL COMMENT '创建时间',
  `update_time` int(10) NOT NULL COMMENT '更新时间',
  `last_login_time` int(10) NOT NULL COMMENT '最后登录时间',
  `last_login_ip` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '最后登录ip',
  `operate_user` varchar(100) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '操作人',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `username`(`username`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_general_ci;